From 2cfaf5bc920b79624f5315f83991de9ee8ba5f84 Mon Sep 17 00:00:00 2001
From: lecoanet
Date: Mon, 20 Jan 2003 09:53:21 +0000
Subject: *** empty log message ***

---
 doc/refman.tex | 27 ++++++++++++++-------------
 1 file changed, 14 insertions(+), 13 deletions(-)

(limited to 'doc/refman.tex')

diff --git a/doc/refman.tex b/doc/refman.tex
index 35a2784..633c658 100644
--- a/doc/refman.tex
+++ b/doc/refman.tex
@@ -1742,11 +1742,11 @@ false.
   \item{\ident{add}} to extend the surface of the curve. In this case there is a mandatory
   flag describing the way the contour will be added. It may take the following values:
   \begin{description}
-	\item{0} the list of points is taken unchanged. In this case, the {\tt coordListOrTagOrId}
-	parameter cannot be a tag and must be an explicit list of points.
-	\item{1} the list of points is reverted, if needed, so that the points defines
+        \item{0} the list of points is taken unchanged. In this case, the {\tt coordListOrTagOrId}
+        parameter cannot be a tag and must be an explicit list of points.
+        \item{1} the list of points is reverted, if needed, so that the points defines
                  a {\bf counterclockwise} contour.
-	\item{-1} the list of points is reverted,if needed, so that the points  defines
+        \item{-1} the list of points is reverted,if needed, so that the points  defines
                  a {\bf clockwise} contour.
   \end{description}
   \item{\ident{remove}} to remove an existing contour
@@ -1991,11 +1991,11 @@ false.
 
 \begin{blockindent}
   This command fits a sequence of Bezier segments on the curve described by the vertices
-  in {\tt coordList} and returns a list of vertices describing the control points for the
-  generated segments. All the points on the fitted segments will be within {\tt error}
-  distance from the given curve.  {\tt coordList} should be either a flat list of even
-  number of coordinates in x, y order or a lst of [X, Y]. The returned list can be directly used
-  to create or change a curve item contour.
+  in {\tt coordList} and returns a list of lists describing the points and control points
+  for the generated segments. All the points on the fitted segments will be within {\tt error}
+  distance from the given curve.  {\tt coordList} should be either a flat list of an even
+  number of coordinates in x, y order or a list of lists of point coordinates X, Y.
+  The returned list can be directly used to create or change a curve item contour.
 \end{blockindent}
 
 
@@ -2362,11 +2362,12 @@ false.
 {\tt\large @coords = \$zinc->{\bf smooth}(coordList);}
 
 \begin{blockindent}
-  This command computes a sequence of Bezier segments in order to smooth the curve
+  This command computes a sequence of Bezier segments that will smooth the polygon
   described by the vertices in {\tt coordList} and returns a list of lists describing
-  points and control points for the generated segments. {\tt coordList} should be either a
-  flat list of even number of coordinates in x, y order, or a list of [X, Y].
-  The returned list can be used to create or change a contour of a curve item.
+  thr points and control points for the generated segments. {\tt coordList} should be either a
+  flat list of an even number of coordinates in x, y order, or a list of lists of point
+  coordinates X, Y. The returned list can be used to create or change the contour of a
+  curve item.
 \end{blockindent}
 
 
-- 
cgit v1.1

